From 1fc7f2cac854c9add322192be3f1c908fcb83885 Mon Sep 17 00:00:00 2001
From: René den Hertog
Date: Mon, 2 Oct 2017 00:15:19 +0200
Subject: Start the skeleton of the 'Manual Testing' & 'Automated Testing'
 sections.

---
 assignments/assignment1.tex | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'assignments/assignment1.tex')

diff --git a/assignments/assignment1.tex b/assignments/assignment1.tex
index 525a44a..ebe7f8a 100644
--- a/assignments/assignment1.tex
+++ b/assignments/assignment1.tex
@@ -197,6 +197,13 @@ The tests will either be stored in the examples database (directory) or will be
 
 Since Haskell, as most functional programming languages, is ``stable" in terms of side effects and randomness, reproductivity should no be an issue. Nevertheless, we will make sure every test case can be reproduced, that is, run again leading to the same results as is documented.
 
+\section{Manual Testing}
+
+% TODO : Add the "results" of the exercises of section 2 of the assignment.
+
+\section{Automated Testing}
+
+% TODO : Add the "results" of the exercises of section 3 of the assignment.
 
 \begin{thebibliography}{8}
 	\bibitem[C]    {C}    \url{http://haskell.org/cabal}
-- 
cgit v1.2.3

