<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">From c38601f0b0fa8f2d64701ac92b1186a1293bf6c3 Mon Sep 17 00:00:00 2001
From: Camil Staps
Date: Sun, 25 Dec 2016 01:54:15 +0100
Subject: Current status; small fixes; more optimisation ideas in log

---
 thesis/thesis.tex | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'thesis/thesis.tex')

diff --git a/thesis/thesis.tex b/thesis/thesis.tex
index 9e320c2..7ebb7ad 100644
--- a/thesis/thesis.tex
+++ b/thesis/thesis.tex
@@ -62,13 +62,12 @@ It produces on average 20\% smaller code than the ARM code generator, which is o
 \appendix
 \input{terms}
 \input{system}
+\input{status}
 
 \ifdraft\else
 \cleardoublepage
 \fi
 
-\let\oldurl\url
-\renewcommand{\url}[1]{{\small\oldurl{#1}}}
 % See http://tex.stackexchange.com/a/40750/23992
 \DeclareRobustCommand{\VAN}[1]{van #1}
 \phantomsection\addcontentsline{toc}{section}{\bibname}
-- 
cgit v1.2.3

</pre></body></html>